ALTER TABLE `xxb_entry` ADD `optional` tinyint(1) unsigned NOT NULL DEFAULT '0' AFTER `integration`;
ALTER TABLE `xxb_entry` ADD `enable` tinyint(1) unsigned NOT NULL DEFAULT '0' AFTER `optional`;